From 7fe9aed30a0431bdf3296c700bc7819d38446c73 Mon Sep 17 00:00:00 2001
From: Magnus Hagander <magnus@hagander.net>
Date: Sat, 21 May 2016 12:50:20 -0400
Subject: [PATCH] Serve planet layout images from the local webserver

It's kind of silly to pull them down from www.postgresql.org each time.
And with the switch to https-only there, it will also lead to a bunch of
extra redirects which will slow things down.
---
 template/base.tmpl     |   4 ++--
 www/css/planet.css     |   2 +-
 www/css/planet_reg.css |   2 +-
 www/img/hdr_fill.png   | Bin 0 -> 335 bytes
 4 files changed, 4 insertions(+), 4 deletions(-)
 create mode 100644 www/img/hdr_fill.png

diff --git a/template/base.tmpl b/template/base.tmpl
index b6a9985..232f683 100644
--- a/template/base.tmpl
+++ b/template/base.tmpl
@@ -11,8 +11,8 @@
  <body>
   <div id="planetWrap">
    <div id="planetHeader">
-    <div class="fl"><a href="/"><img src="http://www.postgresql.org/layout/images/hdr_left.png" alt="PostgreSQL" /></a></div>
-    <div class="fr"><img width="210" height="80" src="http://www.postgresql.org/layout/images/hdr_right.png" alt="The world's most advanced open source database" /></div>
+    <div class="fl"><a href="/"><img src="/img/hdr_left.png" alt="PostgreSQL" /></a></div>
+    <div class="fr"><img width="210" height="80" src="/img/hdr_right.png" alt="The world's most advanced open source database" /></div>
     <div class="cb"></div>
    </div> <!-- planetHeader -->
    <div id="planetMain">
diff --git a/www/css/planet.css b/www/css/planet.css
index 0a59bce..854cdeb 100644
--- a/www/css/planet.css
+++ b/www/css/planet.css
@@ -9,7 +9,7 @@ body {
 
 div#planetHeader {
   width: 100%;
-  background: url(http://www.postgresql.org/layout/images/hdr_fill.png);
+  background: url(/img/hdr_fill.png);
   padding: 0 0 0 0;
   height: 80px;
   margin: 5px 0 2px 0;
diff --git a/www/css/planet_reg.css b/www/css/planet_reg.css
index 05f3023..39de463 100644
--- a/www/css/planet_reg.css
+++ b/www/css/planet_reg.css
@@ -1,7 +1,7 @@
 div#planethdr {
    padding-left: 0px;
    padding-right: 0px;
-   background: url(http://www.postgresql.org/layout/images/hdr_fill.png);
+   background: url(/img/hdr_fill.png);
 }
 
 input.form-control[type=checkbox] {
diff --git a/www/img/hdr_fill.png b/www/img/hdr_fill.png
new file mode 100644
index 0000000000000000000000000000000000000000..ed2e57cbd6835481d7d2de822c4cf69a999c2c2d
GIT binary patch
literal 335
zcmV-V0kHmwP)<h;3K|Lk000e1NJLTq000yK002-30{{R3E}o@D00004XF*Lt006JZ
zHwB960000PbVXQnQ*UN;cVTj606}DLVr3vnZDD6+Qe|Oed2z{QJOBUyW>8F2MF5Sv
z0F%Q2m&gE?#{iJO0GiDJn#=&0$pDYP0GZ4HlEVOuy8w>70F=Z4mB#>^%>b6j0Fl4|
zjl2MmzyO!Y0F%T3oX-H5$^ewb0GrMLjJg1iz5tTK0FJ!?naco`#sHDQ0E@X)y*j@D
z003`EL_t(|+U&?T62brw1h6INoJ}(S|0F%5!q=lx`9S{plMNJd0qJfJ&L!jtg}g%{
zr;s5y58&KES}5cL3OR@Lz<C1a3UY-)zM+t7$N-#MNFSU>a84i>DC7$YIfIPBIRfVf
ha)Uyip?iJ>7yzCagMHqoa9jWY002ovPDHLkV1oVIef9tV

literal 0
HcmV?d00001

-- 
2.39.5

