From 758865aaea9c7692adf2cf4c71a8400776b6e190 Mon Sep 17 00:00:00 2001
From: Magnus Hagander <magnus@hagander.net>
Date: Wed, 27 Jan 2010 10:27:06 +0100
Subject: [PATCH] Fix error message when trying to add an empty feed.

---
 hamnadmin/register/views.py | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

diff --git a/hamnadmin/register/views.py b/hamnadmin/register/views.py
index 11ddc9b..d5685a9 100644
--- a/hamnadmin/register/views.py
+++ b/hamnadmin/register/views.py
@@ -73,7 +73,8 @@ def new(request):
 		l = len(feed.entries)
 		if l < 1:
 			raise pExcept('Blog feed contains no entries.')
-
+	except pExcept:
+		raise
 	except Exception, e:
 		raise pExcept('Failed to download blog feed')
 	if not status == 200:
-- 
2.39.5

